extcuraengine slice -l test.stl -o test.gcode -s layer_height=0.25 -s machine_wi 1,359,984,056 bytes x seconds Tue Apr 21 20:32 2020

seconds

0.0 20.0 40.0 60.0 bytes

0M

5M

10M

15M

20M

25M

30M

OTHER

(8114)chunk.(...)/chunk/par...

(8827)lineIntersection/line...

(8104)parListChunk/runEval/...

(8518)sliceObject/run.(...)...

(8470)allIntersections/laye...

(8044)centeredFacetsFromSTL...

(9487)unstreamChunks/resize...

(8601)make2DExtrudeGCode/gc...

(8075)facetsFromSTL.(...)/f...

(8126)shiftFacet/centeredFa...

(8095)makeLines/readFacet/f...

(8490)roundPoint/allInterse...

(8096)lineFromEndpoints/mak...

(8092)readPoint.readVertex/...

(8099)addPoints/lineFromEnd...

(8131)addPoints/shiftFacet....

(3292)PINNED

(8128)shiftFacet.\/shiftFac...

(7798)run/main