extopenscad -r 0.25 -f asciistl lulzbot_long_bearing_holder.escad -o lulzbot_lon 5,380,401,068,277 bytes x seconds Tue Mar 2 11:06 2021

seconds

0.0 2000.0 4000.0 6000.0 8000.0 10000.0 bytes

0M

200M

400M

600M

800M

1,000M

1,200M

1,400M

1,600M

(1744)getSegs/getMesh/symbo...

(1782)tesselateLoop/getMesh...

(1725)getImplicitShared/get...

(1694)getMesh/symbolicGetMe...